<template>
  <div class="app-container">
    <el-form :model="queryParams" ref="queryForm" size="small" :inline="true" v-show="showSearch" label-width="68px">
      <el-form-item label="会员昵称" prop="nickName">
        <el-input
          v-model="queryParams.nickName"
          placeholder="请输入单个会员昵称搜索"
          clearable
          @keyup.enter.native="handleQuery"
        />
      </el-form-item>
      <el-popover placement="top-start" width="200" trigger="click"
                  content="手机号码和用户编号，满足其中之一内容即可">
        <el-form-item label="用户编号" prop="userIdArray" slot="reference">
          <el-input
            v-model="queryParams.userIdArray"
            placeholder="搜索多个请用英文逗号隔开"
            clearable
            @keyup.enter.native="handleQuery"
          />
        </el-form-item>
      </el-popover>
      <el-popover placement="top-start" width="200" trigger="click"
                  content="手机号码和用户编号，满足其中之一内容即可">
        <el-form-item label="手机号码" prop="userPhone" slot="reference">
          <el-input
            v-model="queryParams.userPhone"
            placeholder="搜索多个请用英文逗号隔开"
            clearable
            @keyup.enter.native="handleQuery"
          />
        </el-form-item>
      </el-popover>

      <el-form-item label="仪器名称" prop="source">
        <el-select
          v-model="queryParams.instrumentIdArray"
          placeholder="请选择类型"
          multiple
          :style="{ width: '100%' }"
          clearable
        >
          <el-option
            v-for="item in instrumentList"
            :key="item.id"
            :label="item.name"
            :value="item.id">
          </el-option>
        </el-select>
      </el-form-item>
      <el-form-item label="绑定状态" prop="source">
        <el-select
          v-model="queryParams.bindingStatus"
          placeholder="请选择类型"
          :style="{ width: '100%' }"
          clearable
        >
          <el-option label="全部" value="" />
          <el-option label="已绑定" value="0" />
          <el-option label="已解绑" value="2" />
        </el-select>
      </el-form-item>
      <el-form-item label="仪器ID" prop="instrumentId">
        <el-input
          v-model="queryParams.instrumentId"
          placeholder="请输入仪器ID进行搜索"
          clearable
          @keyup.enter.native="handleQuery"
        />
      </el-form-item>
      <el-form-item label="序列号" prop="serial">
        <el-input
          v-model="queryParams.serial"
          placeholder="请输入序列号进行搜索"
          clearable
          @keyup.enter.native="handleQuery"
        />
      </el-form-item>
      <el-form-item label="操作开始" prop="startTime">
        <el-date-picker clearable
                        v-model="queryParams.startTime"
                        type="datetime"
                        value-format="yyyy-MM-dd HH:mm"
                        placeholder="请选择操作开始时间">
        </el-date-picker>
      </el-form-item>
      <el-form-item  prop="endTime">
        <el-date-picker clearable
          v-model="queryParams.endTime"
          type="datetime"
          value-format="yyyy-MM-dd HH:mm"
          placeholder="请选择操作结束时间">
        </el-date-picker>
      </el-form-item>
      <el-form-item>
        <el-button type="primary" icon="el-icon-search" size="mini" @click="handleQuery">搜索</el-button>
        <el-button icon="el-icon-refresh" size="mini" @click="resetQuery">重置</el-button>
      </el-form-item>
    </el-form>

    <!-- 批量操作下拉选项   -->
    <el-row :gutter="10" class="mb8">
      <el-col :span="1.5">
        <el-select v-model="batchOperateValue" placeholder="批量操作" size="mini" clearable>
          <el-option label="导出数据" :value="1"></el-option>
          <el-option label="导出全量数据" :value="2"></el-option>
        </el-select>
      </el-col>
      <el-col :span="1.5">
        <el-button
          type="primary"
          plain
          icon="el-icon-warning"
          size="mini"
          @click="batchOperate()"
        >确认
        </el-button>
      </el-col>
      <right-toolbar :showSearch.sync="showSearch" @queryTable="getList"></right-toolbar>
    </el-row>

    <el-table v-loading="loading" :data="userInstrumentList" @selection-change="handleSelectionChange">
      <el-table-column type="selection" width="55" align="center" />
      <el-table-column label="序号" align="center" prop="id" />
      <el-table-column label="头像" align="center" prop="wxUserMember.headimg" >
        <template slot-scope="scope">
          <el-image :src="scope.row.wxUserMember.headimg" style="width: 60px;height: 80px" :preview-src-list="[scope.row.wxUserMember.headimg]">
            <div slot="placeholder" class="image-slot"><span class="dot"></span>
            </div>
          </el-image>
        </template>
      </el-table-column>
      <el-table-column label="会员昵称" align="center" prop="wxUserMember.nickname" />
      <el-table-column label="用户编号" align="center" prop="wxUserMember.id" />
      <el-table-column label="手机号码" align="center" prop="wxUserMember.mobile" />
      <el-table-column label="仪器名称" align="center" prop="wxInstrument.name" />
      <el-table-column label="保修年限" align="center" prop="guarantee" />
      <el-table-column label="保修到期时间" align="center" prop="guaranteeEndtime" width="180">
        <template slot-scope="scope">
          <span>{{ parseTime(scope.row.guaranteeEndtime, '{y}-{m}-{d} {h}:{i}') }}</span>
        </template>
      </el-table-column>
      <el-table-column label="绑定状态" align="center" prop="bindingStatus" >
        <template slot-scope="scope">
          <span v-show="scope.row.bindingStatus == 0">已绑定</span>
          <span v-show="scope.row.bindingStatus == 1">未绑定</span>
          <span v-show="scope.row.bindingStatus == 2">已解绑</span>
        </template>
      </el-table-column>
      <el-table-column label="操作" align="center" class-name="small-padding fixed-width">
        <template slot-scope="scope">
          <el-button
            size="mini"
            type="text"
            icon="el-icon-view"
            @click="detailShow(scope.row)"
            v-hasPermi="['system:instrument:edit']"
          >记录详情</el-button>
          <el-button
            size="mini"
            type="text"
            icon="el-icon-delete"
            @click="bingCancel(scope.row)"
            v-if="scope.row.bindingStatus == 0"
            v-hasPermi="['system:instrument:edit']"
          >解绑</el-button>
          <el-button
            size="mini"
            type="text"
            icon="el-icon-delete"
            @click="bingCancel(scope.row)"
            v-if="scope.row.bindingStatus != 0"
            disabled
            v-hasPermi="['system:instrument:edit']"
          >解绑</el-button>
          <el-button
            size="mini"
            type="text"
            icon="el-icon-bell"
            @click="changeSerialHandler(scope.row)"
            v-hasPermi="['system:instrument:edit']"
          >换绑序列号</el-button>
          <el-button
            size="mini"
            type="text"
            icon="el-icon-edit"
            @click="changeGuaranteeHandler(scope.row)"
            v-hasPermi="['system:instrument:edit']"
          >编辑保修年限</el-button>
        </template>
      </el-table-column>
    </el-table>

    <pagination
      v-show="total>0"
      :total="total"
      :page.sync="queryParams.pageNum"
      :limit.sync="queryParams.pageSize"
      @pagination="getList"
    />

    <!-- 添加或修改用户仪器绑定对话框 -->
    <el-dialog :title="title" :visible.sync="open" width="500px" append-to-body>
      <el-form ref="form" :model="form" :rules="rules" label-width="80px">
        <el-form-item label="用户id" prop="userId">
          <el-input v-model="form.userId" placeholder="请输入用户id" />
        </el-form-item>
        <el-form-item label="序列号" prop="serial">
          <el-input v-model="form.serial" placeholder="请输入序列号" />
        </el-form-item>
        <el-form-item label="仪器id" prop="instrumentId">
          <el-input v-model="form.instrumentId" placeholder="请输入仪器id" />
        </el-form-item>
        <el-form-item label="仪器名称" prop="instrumentName">
          <el-input v-model="form.instrumentName" placeholder="请输入仪器名称" />
        </el-form-item>
        <el-form-item label="序列号图片" prop="serialImage">
          <image-upload v-model="form.serialImage"/>
        </el-form-item>
        <el-form-item label="保修日期" prop="guarantee">
          <el-input v-model="form.guarantee" placeholder="请输入保修日期" />
        </el-form-item>
        <el-form-item label="保修到期时间" prop="guaranteeEndtime">
          <el-date-picker clearable
            v-model="form.guaranteeEndtime"
            type="date"
            value-format="yyyy-MM-dd"
            placeholder="请选择保修到期时间">
          </el-date-picker>
        </el-form-item>
        <el-form-item label="${comment}" prop="remark">
          <el-input v-model="form.remark" placeholder="请输入${comment}" />
        </el-form-item>
      </el-form>
      <div slot="footer" class="dialog-footer">
        <el-button type="primary" @click="submitForm">确 定</el-button>
        <el-button @click="cancel">取 消</el-button>
      </div>
    </el-dialog>
    <!-- 详情记录对话框 -->
    <el-dialog :title="detailTitle" :visible.sync="detailOpen" width="880px" append-to-body>
      <el-table v-loading="loading" :data="userInstrumentLogList">
        <el-table-column label="序号" align="center" prop="id" />
        <el-table-column label="仪器序列号" align="center" prop="serial" />
        <el-table-column label="仪器号图片" align="center" prop="serialImage" >
          <template slot-scope="scope">
            <el-image :src="scope.row.serialImage" style="width: 60px;height: 80px" :preview-src-list="[scope.row.serialImage]">
              <div slot="placeholder" class="image-slot"><span class="dot"></span>
              </div>
            </el-image>
          </template>
        </el-table-column>
        <el-table-column label="类型" align="center" prop="bindingStatus" >
          <template slot-scope="scope">
            <span v-show="scope.row.bindingStatus == 0">已绑定</span>
            <span v-show="scope.row.bindingStatus == 1">未绑定</span>
            <span v-show="scope.row.bindingStatus == 2">已解绑</span>
          </template>
        </el-table-column>
        <el-table-column label="操作时间" align="center" prop="createTime" >
          <template slot-scope="scope">
            <span>{{ parseTime(scope.row.createTime) }}</span>
          </template>
        </el-table-column>
      </el-table>

      <pagination
        v-show="logTotal>0"
        :total="logTotal"
        :page.sync="queryLogParams.pageNum"
        :limit.sync="queryLogParams.pageSize"
        @pagination="getList"
      />
    </el-dialog>
    <el-dialog :title="serialTitle" :visible.sync="serialOpen" width="600px" append-to-body>
      <el-form :model="serialForm" ref="serialForm" label-width="100px" class="demo-ruleForm">
        <el-form-item
          label="序列号"
          prop="changeSerial" >
<!--          :rules="[{ required: true, message: '序列号不能为空'}]"-->
<!--        >-->
          <el-input v-model="serialForm.serial" autocomplete="off" maxlength="30"></el-input>
        </el-form-item>
        <el-form-item>
          <el-button type="primary" @click="submitSerial('serialForm')">提交</el-button>
          <el-button @click="resetSerialForm('serialForm')">重置</el-button>
        </el-form-item>
      </el-form>
    </el-dialog>
    <el-dialog :title="guaranteeTitle" :visible.sync="guaranteeOpen" width="600px" append-to-body>
      <el-form :model="guaranteeForm" ref="guaranteeForm" label-width="100px" class="demo-ruleForm">
        <el-form-item
          label="保修日期"
          prop="changeSerial" >

          <el-select
            v-model="guaranteeForm.guarantee"
            placeholder="请选择保修日期"
            :style="{ width: '100%' }"
            clearable
          >
            <el-option label="1年" value="1" />
            <el-option label="2年" value="2" />
            <el-option label="3年" value="3" />
            <el-option label="4年" value="4" />
          </el-select>
        </el-form-item>
        <el-form-item>
          <el-button type="primary" @click="submitGuarantee()">提交</el-button>
          <el-button @click="resetSerialForm('guaranteeForm')">重置</el-button>
        </el-form-item>
      </el-form>
    </el-dialog>

    <!-- 导出字段选择弹窗   -->
    <el-dialog title="自定义导出字段" :visible.sync="exportFieldsVisible" width="50%"
               :before-close="cancelExportFieldsDialog">
      <el-form ref="form" label-width="150px">
        <el-form-item label="全部字段" prop="allFields">
          <el-switch v-model="allFields" @click.native="isExportAllFields()"/>
        </el-form-item>
      </el-form>
      <el-form :inline="true" ref="form" :model="exportFieldList" label-width="150px">
        <el-form-item label="序号 " prop="nickname">
          <el-switch v-model="exportFieldList.id" :active-value="'id'" :inactive-value="null"/>
        </el-form-item>
        <el-form-item label="会员昵称 " prop="id">
          <el-switch v-model="exportFieldList.nickname" active-value="nickname" :inactive-value="null"/>
        </el-form-item>
        <el-form-item label="手机号 " prop="mobile">
          <el-switch v-model="exportFieldList.mobile" active-value="mobile" :inactive-value="null"/>
        </el-form-item>
        <el-form-item label="保修年限 " prop="guarantee">
          <el-switch v-model="exportFieldList.guarantee" active-value="guarantee" :inactive-value="null"/>
        </el-form-item>
        <el-form-item label="用户编号 " prop="userId">
          <el-switch v-model="exportFieldList.userId" active-value="userId" :inactive-value="null"/>
        </el-form-item>
        <el-form-item label="仪器名称 " prop="instrumentName">
          <el-switch v-model="exportFieldList.instrumentName" active-value="instrumentName" :inactive-value="null"/>
        </el-form-item>
        <el-form-item label="保修到期时间 " prop="guaranteeEndtime">
          <el-switch v-model="exportFieldList.guaranteeEndtime" active-value="guaranteeEndtime" :inactive-value="null"/>
        </el-form-item>
        <el-form-item label="绑定状态 " prop="bindingStatus">
          <el-switch v-model="exportFieldList.bindingStatus" active-value="bindingStatus" :inactive-value="null"/>
        </el-form-item>
        <el-form-item label="详情数据范围 " prop="queryString">
          <el-select
            v-model="exportFieldsForm.queryString"
            placeholder="请选择类型"
            :style="{ width: '100%' }"
            clearable
          >
            <el-option label="最新记录详情" value="single" />
            <el-option label="全部记录详情" value="all" />
          </el-select>
        </el-form-item>
      </el-form>
      <div slot="footer" class="dialog-footer">
        <el-button @click="cancelExportFieldsDialog()">取 消</el-button>
        <el-button type="primary" @click="submitBatchOperate">确 定</el-button>
      </div>
    </el-dialog>
  </div>
</template>

<script>
import { listUserInstrument, getInstrument, delInstrument, addInstrument, updateInstrument,changeSerial,changeGuarantee } from "@/api/system/userInstrument";
import {listInstrument} from "@/api/system/instrument";
import {listLog,addLog} from "@/api/system/userInstrumentLog"
export default {
  name: "Instrument",
  data() {
    return {
      guaranteeOpen: false,
      guaranteeTitle: "编辑保修日期",
      guaranteeForm: {
        id: "",
        guarantee: ""
      },
      serialForm: {
        id: "",
        serial: "",
      },
      // 批量操作类型-下拉项选择
      batchOperateValue: null,
      // 序列号标题
      serialTitle: "换绑序列号",
      // 序列号弹窗
      serialOpen: false,
      // 详情标题
      detailTitle: "记录详情",
      // 详情弹窗
      detailOpen: false,
      // 遮罩层
      loading: true,
      // 选中数组
      ids: [],
      // 非单个禁用
      single: true,
      // 非多个禁用
      multiple: true,
      // 显示搜索条件
      showSearch: true,
      // 总条数
      total: 0,
      // 日记总条数
      logTotal: 0,
      // 用户仪器绑定表格数据
      userInstrumentList: [],
      // 用户仪器绑定日记表格数据
      userInstrumentLogList: [],
      // 仪器表格数据
      instrumentList: [],
      // 弹出层标题
      title: "",
      // 是否显示弹出层
      open: false,
      allFields: false,
      exportFieldList: {
        id: null,
        nickname: null,
        mobile: null,
        guarantee: null,
        userId: null,
        instrumentName: null,
        guaranteeEndtime: null,
        bindingStatus: null,
      },
      exportFieldsForm: {
        userInstrumentIdList: null,
        exportFields: null,
        queryString: "all",
      },
      // 查询参数
      queryParams: {
        pageNum: 1,
        pageSize: 10,
        nickName:null,
        userId: null,
        serial: null,
        instrumentId: null,
        instrumentName: null,
        serialImage: null,
        guarantee: null,
        guaranteeEndtime: null,
        bindingStatus: "",
        status: null,
        startTime:null,
        entTime:null,
        instrumentIdArray: null,
        userIdArray: null
      },
      queryLogParams: {
        pageNum: 1,
        pageSize: 10,
        userInstrumentId: null,
      },
    // 导出数据选择字段
    exportFieldsVisible: false,
      // 表单参数
      form: {},
      // 表单校验
      rules: {
        userId: [
          { required: true, message: "用户id不能为空", trigger: "blur" }
        ],
        serial: [
          { required: true, message: "序列号不能为空", trigger: "blur" }
        ],
        instrumentId: [
          { required: true, message: "仪器id不能为空", trigger: "blur" }
        ],
        instrumentName: [
          { required: true, message: "仪器名称不能为空", trigger: "blur" }
        ],
        serialImage: [
          { required: true, message: "序列号图片不能为空", trigger: "blur" }
        ],
        guarantee: [
          { required: true, message: "保修日期不能为空", trigger: "blur" }
        ],
        guaranteeEndtime: [
          { required: true, message: "保修到期时间不能为空", trigger: "blur" }
        ],
        bindingStatus: [
          { required: true, message: "绑定状态，1未绑定，2已解绑不能为空", trigger: "change" }
        ],
      }
    };
  },
  created() {
    this.getList();
    this.queryInstrument();
  },
  methods: {
    resetSerialForm(formName) {
      this.serialForm.serial = ""
      this.guaranteeForm.guarantee = "";
    },
    queryInstrument(){
      listInstrument({}).then(response => {
        this.instrumentList = response.rows;
      });
    },
    /** 查询用户仪器绑定列表 */
    getList() {
      this.loading = true;
      listUserInstrument(this.queryParams).then(response => {
        this.userInstrumentList = response.rows;
        this.total = response.total;
        this.loading = false;
      });
    },
    // 取消按钮
    cancel() {
      this.open = false;
      this.reset();
    },
    // 表单重置
    reset() {
      this.form = {
        id: null,
        userId: null,
        serial: null,
        instrumentId: null,
        instrumentName: null,
        serialImage: null,
        guarantee: null,
        guaranteeEndtime: null,
        bindingStatus: null,
        status: null,
        createBy: null,
        createTime: null,
        updateBy: null,
        updateTime: null,
        remark: null
      };
      this.resetForm("form");
    },
    /** 搜索按钮操作 */
    handleQuery() {
      this.queryParams.pageNum = 1;
      this.getList();
    },
    /** 重置按钮操作 */
    resetQuery() {
      this.resetForm("queryForm");
      this.handleQuery();
    },
    // 多选框选中数据
    handleSelectionChange(selection) {
      this.ids = selection.map(item => item.id)
      this.single = selection.length!==1
      this.multiple = !selection.length
    },
    /** 新增按钮操作 */
    handleAdd() {
      this.reset();
      this.open = true;
      this.title = "添加用户仪器绑定";
    },
    /** 修改按钮操作 */
    handleUpdate(row) {
      this.reset();
      const id = row.id || this.ids
      getInstrument(id).then(response => {
        this.form = response.data;
        this.open = true;
        this.title = "修改用户仪器绑定";
      });
    },
    /** 提交按钮 */
    submitForm() {
      this.$refs["form"].validate(valid => {
        if (valid) {
          if (this.form.id != null) {
            updateInstrument(this.form).then(response => {
              this.$modal.msgSuccess("修改成功");
              this.open = false;
              this.getList();
            });
          } else {
            addInstrument(this.form).then(response => {
              this.$modal.msgSuccess("新增成功");
              this.open = false;
              this.getList();
            });
          }
        }
      });
    },
    /** 删除按钮操作 */
    handleDelete(row) {
      const ids = row.id || this.ids;
      this.$modal.confirm('是否确认删除用户仪器绑定编号为"' + ids + '"的数据项？').then(function() {
        return delInstrument(ids);
      }).then(() => {
        this.getList();
        this.$modal.msgSuccess("删除成功");
      }).catch(() => {});
    },
    /** 导出按钮操作 */
    handleExport() {
      this.download('system/instrument/export', {
        ...this.queryParams
      }, `instrument_${new Date().getTime()}.xlsx`)
    },
    /** 展示详情 */
    detailShow(row){
      this.queryLogParams.userInstrumentId = row.id;
      listLog(this.queryLogParams).then(response => {
        this.detailOpen = true;
        this.userInstrumentLogList = response.rows;
        this.logTotal = response.total;
      });

    },
    /** 解绑 */
    bingCancel(row){
      this.$confirm('确定将选择的数据解绑序列号？【请谨慎操作，一旦成功将无法撤销】, 是否继续?', '提示', {
        confirmButtonText: '确定',
        cancelButtonText: '取消',
        type: 'warning'
      }).then(() => {
        // 判断是否绑定状态
        if (row.bindingStatus == 1 || row.bindingStatus == 2) {
          this.$message({
            type: 'error',
            message: '当前状态不支持解绑'
          });
          return ;
        }
        const updateForm= {id: row.id,bindingStatus: 2};
        updateInstrument(updateForm).then(response => {
          this.$message({
            type: 'success',
            message: '解绑成功!'
          });
        });
        // 增加一条记录
        const logForm = {
          userInstrumentId: row.id,
          userId: row.userId,
          serial: row.serial,
          instrumentName: row.instrumentName,
          guarantee: row.guarantee,
          guaranteeEndtime: row.guaranteeEndtime,
          bindingStatus: 2,
          instrumentId: row.instrumentId,
          serialImage: row.serialImage,
          status: 0
        };
        addLog(logForm).then(response => {
          this.getList();
        });

      }).catch(() => {
        this.$message({
          type: 'info',
          message: '已取消解绑'
        });
      });

    },
    // 换绑
    changeSerialHandler(row){
      this.serialForm.serial = ""
      this.serialOpen = true;
      this.serialForm.id = row.id;
    },
    submitSerial(){
      if (!this.serialForm.serial) {
        this.$modal.msgError("序列号不能为空");
        return;
      }
      var pattern = /^[a-zA-Z0-9\s]+$/;
      if (!pattern.test(this.serialForm.serial)) {
        this.$modal.msgError("请输入正确的序列号");
        return;
      }
      changeSerial(this.serialForm).then(response => {
        if (response.data.code != 200) {
          this.$modal.msgError(response.data.message);
        } else {
          this.$modal.msgSuccess("换绑序列号成功");
          this.serialOpen = false;
          this.getList();
        }
      });
    },
    // 保修日期处理
    changeGuaranteeHandler(row){
      this.guaranteeForm.guarantee = "";
      this.guaranteeOpen = true;
      this.guaranteeForm.id = row.id;
    },
    submitGuarantee(){
      if (!this.guaranteeForm.guarantee) {
        this.$modal.msgError("保修日期不能为空");
        return;
      }
      changeGuarantee(this.guaranteeForm).then(response => {
        this.$modal.msgSuccess("保修日期更新成功");
        this.guaranteeOpen = false;
        this.getList();
      });
    },
    // 批量操作
    batchOperate() {
      if (this.batchOperateValue == null ||  this.batchOperateValue == '') {
        this.$message.error("请选择您的操作");
        return;
      }
      if (this.batchOperateValue == 1) {
        if (this.ids.length == 0) {
          this.$message.error("请选择数据");
          return
        }
      }
      this.exportFieldsVisible = true;
    },
    // 取消操作
    cancelExportFieldsDialog() {
      this.allFields = false;
      this.exportFieldsVisible = false
      this.exportFieldList = {
        id: null,
        nickname: null,
        mobile: null,
        guarantee: null,
        userId: null,
        instrumentName: null,
        guaranteeEndtime: null,
        bindingStatus: null,
      }
    },
    // 批量操作
    submitBatchOperate() {
      // 导出用户数据
      if (this.batchOperateValue == 1) {
        let exportFields = Object.values(this.exportFieldList).filter(val => val != null);
        if (exportFields.length == 0) {
          this.$modal.msgError("请选择导出字段");
          return;
        }
        this.exportFieldsForm.userInstrumentIdList = this.ids;
        this.exportFieldsForm.exportFields = exportFields;
        this.download('/system/userInstrument/batchExport', {
          ...this.exportFieldsForm
        }, `仪器绑定_${new Date().getTime()}.xlsx`);
        this.cancelExportFieldsDialog();
      }
      if (this.batchOperateValue == 2) {
        let exportFields = Object.values(this.exportFieldList).filter(val => val != null);
        if (exportFields.length == 0) {
          this.$modal.msgError("请选择导出字段");
          return;
        }
        this.queryParams.userInstrumentIdList = null;
        this.queryParams.exportFields = exportFields;
        this.download('/system/userInstrument/batchExport', {
          ...Object.assign({}, this.queryParams, {exportFields: exportFields})
        }, `仪器绑定_${new Date().getTime()}.xlsx`)
        this.cancelExportFieldsDialog();
      }
    },
    isExportAllFields() {
      if (this.allFields) {
        this.exportFieldList.nickname = "nickname";
        this.exportFieldList.id = "id";
        this.exportFieldList.mobile = "mobile";
        this.exportFieldList.guarantee = "guarantee";
        this.exportFieldList.userId = "userId";
        this.exportFieldList.instrumentName = "instrumentName";
        this.exportFieldList.guaranteeEndtime = "guaranteeEndtime";
        this.exportFieldList.bindingStatus = "bindingStatus";
      } else {
        this.exportFieldList.nickname = null;
        this.exportFieldList.id = null;
        this.exportFieldList.mobile = null;
        this.exportFieldList.guarantee = null;
        this.exportFieldList.userId = null;
        this.exportFieldList.instrumentName = null;
        this.exportFieldList.guaranteeEndtime = null;
        this.exportFieldList.bindingStatus = null;
      }
    },
  }
};
</script>
